)^2

(MeV/c σ

0

5

10

a)

(GeV/c) tp 1 10

)^2

(MeV/c 0πm

130 132 134 136 138 140 b)

PCM PHOS

Data MC

PCM PHOS

Data MC FWHM/2.36 σ